Synfluid® mPAO-65 cSt

Synfluid® mPAO 65 cSt is a highly branched isoparaffinic polyalphaolefin for use in many industrial and automotive lubricant applications. These include gear oils, compressor oils, engine oils, hydraulic fluids, greases, and other functional fluids.

The post Synfluid® mPAO-65 cSt appeared first on Sea-Land Chemical Company.