Synfluid® PAO 8 cSt HVI

Synfluid® PAO 8 cSt HVI is a highly branched isoparaffinic polyalphaolefin for use in many industrial and automotive lubricant applications. These include gear oils, compressor oils, engine oils, hydraulic fluids,…

The post Synfluid® PAO 8 cSt HVI appeared first on Sea-Land Chemical Company.