Synfluid® mPAO-100 cSt

Synfluid® mPAO 100 cSt is a highly branched isoparaffinic polyalphaolefin for use in many industrial and automotive lubricant applications. These include gear oils, compressor oils, engine oils, hydraulic fluids, greases, and other functional fluids.

The post Synfluid® mPAO-100 cSt appeared first on Sea-Land Chemical Company.